Ein Beispiel zur Fourier–Reihe mit einem durch gnuplot erzeugten Graph.

Die Funktion

f(x) = π 4 · � 1 für x ∈ (0, 1], −1 für x ∈ (−1, 0].

hat Periode T = 2 und die Fourier–Reihe

r(x) = a_0 2 + ∞� n=1 (a_n cos(πn x) + b_n sin(πn x)) , mit Koeffizienten

a_n =

�_1 −1 f(x) cos(πn x) dx = 0,

b_n =

�_1 −1 f(x) sin(πn x) dx =

�_1 n n ungerade 0 n gerade

#! / usr / b i n / g n u p l o t

f ( x)= p i /4∗(1 −2∗((( f l o o r ( x)%2)+2)%2))

c ( k , x)= s i n ( ( 2 ∗ k−1)∗ p i ∗x ) / ( 2 ∗ k−1)

f r ( k , x)=(k ==0)?0: f r ( k −1,x)+c ( k , x )

set zeroaxis set samples 500 set key below set l m a r g i n s c r e e n 0 . 0 7

set term push set term p o s t enh c o l o r lw 2 20 set output " f o u r i e r . e p s " plot [ − 0 . 5 : 2 . 5 ] f ( x ) wi l i lw 3 , \ f r ( 1 , x ) t i " f_1 ( x ) " , \ f r ( 3 , x ) t i " f_3 ( x ) " , \ f r ( 7 , x ) t i " f_7 ( x ) " u n s e t output set term pop